reference tests() reference tests()

Name

reference tests − how to markup

link adr in .UR .UE or simply in parantheses • man and mandoc convert UR/UE to < and >. • pandoc transforms

See the `Python home page <https://www.python.org>`_ for info.

to

see See the Python home page (https://www.python.org) for info.

test for references in man pages embedded in a paragraph • at line start • in line • at eol

at start of paragraph • followed by text • at eol

at end of paragraph tests

See <https://docutils.sourceforge.io/docs/user/rst/quickref.html#explicit−markup> for more

See the Python home page <https://www.python.org> for info.

External hyperlinks, like Python <https://www.python.org> .

Want to learn about my favorite programming language <https://www.python.org> ?

Clicking on this internal hyperlink will take us to the target below.

The hyperlink target above points to this paragraph. • bullet list • second item, with hyperlink target.

See the Python <https://www.python.org> home page for info.

Write to me <mailto:jdoe@example.com> with your questions.

The one−liner <https://docutils.sourceforge.io/rst.html> and starts−on−this−line <https://docutils.sourceforge.net/rst.html> or entirely−below <https://docutils.sourceforge.net/rst.html> point to <https://docutils.sourceforge.io/rst.html> and in man are ... ?

reference tests() reference tests()

Escaped whitespace is preserved as intentional spaces, e.g.: some reference <../local path with spaces.html> to a local path.

Anonymous hyperlink references are specified with two underscores instead of one: See the web site of my favorite programming language <https://www.python.org> . Anonymous targets begin with ".. __:"; no reference name is required or allowed: